From 51febddd0d6da1ac3e19a27b0761672dda1a1f55 Mon Sep 17 00:00:00 2001
From: thing1 <thing1@seacrossedlovers.xyz>
Date: Wed, 12 Mar 2025 19:52:11 +0000
Subject: wow

---
 electronics/cw2/writeup.tex | 38 +++++++++++++++++++-------------------
 1 file changed, 19 insertions(+), 19 deletions(-)

(limited to 'electronics/cw2/writeup.tex')

diff --git a/electronics/cw2/writeup.tex b/electronics/cw2/writeup.tex
index 902402a..d5ad2d7 100644
--- a/electronics/cw2/writeup.tex
+++ b/electronics/cw2/writeup.tex
@@ -159,25 +159,25 @@ To test this system, I can measure the current in and the current out, and see h
 \subsection{Full circuit diagram}
 % put a full design here (glue all the previous designs together)
 
-\subsection{Subsystem testing} % tables, tables and more tables, no need to show the actual testing, the next section is for that
-\subsubsection{The receiver} 
-\subsubsection{The initial amplifier}
-\subsubsection{The demodulation system}
-\subsubsection{The volume boost amplifier}
-\subsubsection{The audio normalisation filter and dividing amplifier}
-\subsubsection{The audio intensity meter}
-\subsubsection{The push pull power amplifier}
-\subsubsection{The speaker} 
-
-\subsection{Subsystem results}
-\subsubsection{The receiver} % might be able to cut this, or make it very short
-\subsubsection{The initial amplifier}
-\subsubsection{The demodulation system}
-\subsubsection{The volume boost amplifier}
-\subsubsection{The audio normalisation filter and dividing amplifier}
-\subsubsection{The audio intensity meter}
-\subsubsection{The push pull power amplifier}
-\subsubsection{The speaker} % probably can cut this section
+\section{Subsystem testing} % tables, tables and more tables, no need to show the actual testing, the next section is for that
+\subsection{The receiver} 
+\subsection{The initial amplifier}
+\subsection{The demodulation system}
+\subsection{The volume boost amplifier}
+\subsection{The audio normalisation filter and dividing amplifier}
+\subsection{The audio intensity meter}
+\subsection{The push pull power amplifier}
+\subsection{The speaker} 
+
+\section{Subsystem results}
+\subsection{The receiver} % might be able to cut this, or make it very short
+\subsection{The initial amplifier}
+\subsection{The demodulation system}
+\subsection{The volume boost amplifier}
+\subsection{The audio normalisation filter and dividing amplifier}
+\subsection{The audio intensity meter}
+\subsection{The push pull power amplifier}
+\subsection{The speaker} % probably can cut this section
 
 \section{System realisation}
 \subsection{Circuit diagram} % repeat of what was shown before
-- 
cgit v1.2.3

